Summary Page Created:Mon August 28, 2006 23:32 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290198

Instrument: HRC Obs ID: 2642 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02642N002 full img2.fits hrcf02642N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 23:32 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290198

Instrument: HRC Obs ID: 2642 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T03:07:11 Date and time of file creation DATE-OBS 2002-01-26T21:22:01 Observation start date DATE-END 2002-01-26T21:47:11 Observation end date RA PNT 332.26356413185 Pointing RA DEC PNT 45.714757308934 Pointing Dec ROLL PNT 336.36407222315 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T03:30:35 Date and time of file creation DATE-OBS 2002-01-26T21:22:01 Observation start date DATE-END 2002-01-26T21:47:11 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2642 Observation id SEQ NUM 290198 Sequence number RA NOM 332.26356413185 Nominal RA DEC NOM 45.714757308934 Nominal Dec ROLL NOM 336.36407222315 Nominal Roll

Summary Page Created:Mon August 28, 2006 23:32 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290198

Instrument: HRC Obs ID: 2642 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169970 45.742286 5123.856934 77.154472 66.410370 332.170027 45.742282 4757.127441 76.516273 62.171444 331.866465 45.836774 257.472321 37.871536 6.798571 331.848629 45.793353 135.386612 28.183796 4.803704 331.858004 45.823618 168.337494 35.497417 4.742247 331.884149 45.867941 133.095535 32.578896 4.085330 331.885054 45.880257 96.710960 24.181993 3.999297 332.574232 45.607908 94.686272 27.026628 3.503444 332.553059 45.579460 71.791664 21.191118 3.387819 331.909586 45.877122 85.125000 25.744026 3.306592