Summary Page Created:Tue August 29, 2006 03:29 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290201

Instrument: HRC Obs ID: 2645 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02645N002 full img2.fits hrcf02645N002 cntr img2.fits

Summary Page Created:Tue August 29, 2006 03:29 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290201

Instrument: HRC Obs ID: 2645 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T06:55:09 Date and time of file creation DATE-OBS 2002-01-26T22:37:31 Observation start date DATE-END 2002-01-26T23:03:17 Observation end date RA PNT 332.23924317536 Pointing RA DEC PNT 45.758382396788 Pointing Dec ROLL PNT 336.44552805604 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T07:26:32 Date and time of file creation DATE-OBS 2002-01-26T22:37:31 Observation start date DATE-END 2002-01-26T23:03:17 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2645 Observation id SEQ NUM 290201 Sequence number RA NOM 332.23924317536 Nominal RA DEC NOM 45.758382396788 Nominal Dec ROLL NOM 336.44552805604 Nominal Roll

Summary Page Created:Tue August 29, 2006 03:29 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290201

Instrument: HRC Obs ID: 2645 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170190 45.742241 5130.500000 74.733223 68.650864 331.815640 45.836700 77.183037 18.682056 4.131399 331.833061 45.861235 98.172325 24.352674 4.031275 331.842905 45.886083 94.950890 23.944826 3.965403 331.877508 45.924096 77.124107 20.475801 3.766598 331.967211 45.852949 57.269104 16.504683 3.469870 331.861345 45.918397 63.207142 20.262747 3.119377 332.454147 45.738070 28.667500 9.215308 3.110856 331.935360 45.907459 52.655174 16.964138 3.103911