Summary Page Created:Sat September 30, 2006 08:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290206

Instrument: HRC Obs ID: 2650 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02650N002 full img2.fits hrcf02650N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 08:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290206

Instrument: HRC Obs ID: 2650 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:34:08 Date and time of file creation DATE-OBS 2002-08-09T13:20:12 Observation start date DATE-END 2002-08-09T13:45:22 Observation end date RA PNT 332.16317200113 Pointing RA DEC PNT 45.744209348724 Pointing Dec ROLL PNT 165.98256481752 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:42:20 Date and time of file creation DATE-OBS 2002-08-09T13:20:12 Observation start date DATE-END 2002-08-09T13:45:22 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2650 Observation id SEQ NUM 290206 Sequence number RA NOM 332.16317200113 Nominal RA DEC NOM 45.744209348724 Nominal Dec ROLL NOM 165.98256481752 Nominal Roll

Summary Page Created:Sat September 30, 2006 08:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290206

Instrument: HRC Obs ID: 2650 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169987 45.742312 4135.791504 69.093620 59.857796 332.577079 45.666423 301.357147 46.005764 6.550421 332.593081 45.691907 175.188400 38.373154 4.565390 332.585646 45.679433 190.526779 44.078987 4.322395 332.586873 45.710816 173.347321 40.319981 4.299291 331.830355 45.831234 110.583336 26.811234 4.124515 332.582076 45.718670 127.458336 32.638214 3.905187 332.540494 45.726982 103.267960 26.588058 3.883998 332.568010 45.641395 145.409821 38.178146 3.808719 331.818673 45.800654 96.916664 27.210991 3.561674