Summary Page Created:Sat September 30, 2006 09:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290209

Instrument: HRC Obs ID: 2653 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02653N002 full img2.fits hrcf02653N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 09:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290209

Instrument: HRC Obs ID: 2653 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:33:35 Date and time of file creation DATE-OBS 2002-08-09T14:35:41 Observation start date DATE-END 2002-08-09T15:00:52 Observation end date RA PNT 332.17445394574 Pointing RA DEC PNT 45.775761297005 Pointing Dec ROLL PNT 166.74905525639 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:58:56 Date and time of file creation DATE-OBS 2002-08-09T14:35:41 Observation start date DATE-END 2002-08-09T15:00:52 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2653 Observation id SEQ NUM 290209 Sequence number RA NOM 332.17445394574 Nominal RA DEC NOM 45.775761297005 Nominal Dec ROLL NOM 166.74905525639 Nominal Roll

Summary Page Created:Sat September 30, 2006 09:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290209

Instrument: HRC Obs ID: 2653 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170152 45.742329 973.238647 34.908566 27.879650 332.606858 45.748308 279.309814 37.056175 7.537470 332.596510 45.704924 288.765167 47.702950 6.053403 331.835548 45.845193 162.916672 30.284769 5.379492 332.566943 45.757821 167.541260 33.959515 4.933559 332.587776 45.685780 220.357147 45.089985 4.887053 332.427704 45.679781 103.390175 26.228090 3.941964 332.378888 45.688768 81.013794 20.727142 3.908585 332.576531 45.751039 159.750000 41.481869 3.851080 331.993967 45.750768 50.083332 13.648252 3.669579