Summary Page Created:Mon March 23, 2009 15:21 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290211

Instrument: HRC Obs ID: 2655 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02655N005 full img2.fits hrcf02655N005 cntr img2.fits

Summary Page Created:Mon March 23, 2009 15:21 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290211

Instrument: HRC Obs ID: 2655 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 Processing system revision DATE 2009-03-23T19:03:03 Date and time of file creation DATE-OBS 2002-08-09T15:29:09 Observation start date DATE-END 2002-08-09T15:54:30 Observation end date RA PNT 332.02398429563 Pointing RA DEC PNT 45.765471560816 Pointing Dec ROLL PNT 167.035060648 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 Processing system revision DATE 2009-03-23T19:17:43 Date and time of file creation DATE-OBS 2002-08-09T15:29:09 Observation start date DATE-END 2002-08-09T15:54:30 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2655 Observation id SEQ NUM 290211 Sequence number RA NOM 332.02398429563 Nominal RA DEC NOM 45.765471560816 Nominal Dec ROLL NOM 167.035060648 Nominal Roll

Summary Page Created:Mon March 23, 2009 15:21 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290211

Instrument: HRC Obs ID: 2655 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170124 45.742265 1453.367554 43.285946 33.575970 332.446665 45.706938 413.266083 54.201588 7.624612 332.455844 45.738574 291.845551 42.235531 6.909954 332.437668 45.681997 358.376801 53.753353 6.667059 332.434894 45.745613 168.625000 39.720833 4.245253 331.678018 45.813394 156.250000 37.758709 4.138118 332.392969 45.754062 128.724136 31.606489 4.072712 331.684422 45.830784 152.166672 37.761204 4.029709 332.429016 45.651591 114.798218 29.590134 3.879611 331.702043 45.865130 99.583336 26.594500 3.744509