Summary Page Created:Sat September 30, 2006 09:20 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290214

Instrument: HRC Obs ID: 2658 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02658N003 full img2.fits hrcf02658N003 cntr img2.fits

Summary Page Created:Sat September 30, 2006 09:20 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290214

Instrument: HRC Obs ID: 2658 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:51:10 Date and time of file creation DATE-OBS 2002-08-10T08:56:54 Observation start date DATE-END 2002-08-10T09:22:04 Observation end date RA PNT 331.94218348382 Pointing RA DEC PNT 45.814111166644 Pointing Dec ROLL PNT 167.25397558558 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:18:53 Date and time of file creation DATE-OBS 2002-08-10T08:56:54 Observation start date DATE-END 2002-08-10T09:22:04 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2658 Observation id SEQ NUM 290214 Sequence number RA NOM 331.94218348382 Nominal RA DEC NOM 45.814111166644 Nominal Dec ROLL NOM 167.25397558558 Nominal Roll

Summary Page Created:Sat September 30, 2006 09:20 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290214

Instrument: HRC Obs ID: 2658 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170098 45.742100 6934.758789 90.752419 76.414040 332.366071 45.762113 87.930359 20.404903 4.309276 332.365385 45.736960 68.016968 18.074877 3.763067 332.374515 45.791964 63.574108 16.985729 3.742795 332.338781 45.694913 60.297321 16.247738 3.711121 332.355656 45.704338 63.878571 17.658648 3.617410 332.270724 45.707521 43.386208 13.875900 3.126731 331.753171 45.895432 19.795000 6.471392 3.058847