Summary Page Created:Sat September 30, 2006 10:07 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290218

Instrument: HRC Obs ID: 2662 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02662N002 full img2.fits hrcf02662N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 10:07 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290218

Instrument: HRC Obs ID: 2662 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:39:26 Date and time of file creation DATE-OBS 2002-08-10T10:37:34 Observation start date DATE-END 2002-08-10T11:02:44 Observation end date RA PNT 332.25598024495 Pointing RA DEC PNT 45.728778895833 Pointing Dec ROLL PNT 166.73256053499 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T14:05:11 Date and time of file creation DATE-OBS 2002-08-10T10:37:34 Observation start date DATE-END 2002-08-10T11:02:44 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2662 Observation id SEQ NUM 290218 Sequence number RA NOM 332.25598024495 Nominal RA DEC NOM 45.728778895833 Nominal Dec ROLL NOM 166.73256053499 Nominal Roll

Summary Page Created:Sat September 30, 2006 10:07 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290218

Instrument: HRC Obs ID: 2662 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169992 45.742308 8688.363281 99.201614 87.582886 332.661241 45.626067 133.331253 28.073719 4.749326 332.677622 45.651091 119.272324 29.017036 4.110424 331.922919 45.815958 77.958336 19.786507 3.939975 332.547485 45.654621 77.677742 20.218166 3.841978 332.670065 45.638581 115.268753 30.170795 3.820541 332.569894 45.623773 69.750000 18.409595 3.788785 331.949799 45.793082 80.225395 21.442190 3.741474 332.497910 45.741462 29.055172 8.154076 3.563270 332.679335 45.695493 105.351784 30.098806 3.500198