Summary Page Created:Sat September 30, 2006 10:07 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290219

Instrument: HRC Obs ID: 2663 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02663N002 full img2.fits hrcf02663N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 10:07 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290219

Instrument: HRC Obs ID: 2663 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:43:54 Date and time of file creation DATE-OBS 2002-08-10T11:02:44 Observation start date DATE-END 2002-08-10T11:27:54 Observation end date RA PNT 332.07113916558 Pointing RA DEC PNT 45.758710393481 Pointing Dec ROLL PNT 167.08540509921 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T14:05:46 Date and time of file creation DATE-OBS 2002-08-10T11:02:44 Observation start date DATE-END 2002-08-10T11:27:54 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2663 Observation id SEQ NUM 290219 Sequence number RA NOM 332.07113916558 Nominal RA DEC NOM 45.758710393481 Nominal Dec ROLL NOM 167.08540509921 Nominal Roll

Summary Page Created:Sat September 30, 2006 10:07 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290219

Instrument: HRC Obs ID: 2663 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170063 45.742329 9287.428711 99.717171 93.137711 332.170013 45.742358 5354.327637 100.310791 53.377380 332.493504 45.680940 98.061607 24.182459 4.055072 332.502913 45.731865 85.231247 22.582756 3.774174 332.501911 45.706670 86.674110 23.328150 3.715430 331.752688 45.855857 46.901962 15.080843 3.110036 332.426591 45.648401 55.002796 17.747000 3.099273 332.456176 45.641936 56.500000 18.399046 3.070811