Summary Page Created:Sat September 30, 2006 10:18 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290222

Instrument: HRC Obs ID: 2666 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02666N002 full img2.fits hrcf02666N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 10:18 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290222

Instrument: HRC Obs ID: 2666 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:57:06 Date and time of file creation DATE-OBS 2002-08-10T12:18:14 Observation start date DATE-END 2002-08-10T12:52:59 Observation end date RA PNT 332.10650464448 Pointing RA DEC PNT 45.718067658754 Pointing Dec ROLL PNT 167.05189870962 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T14:16:04 Date and time of file creation DATE-OBS 2002-08-10T12:18:14 Observation start date DATE-END 2002-08-10T12:52:59 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2666 Observation id SEQ NUM 290222 Sequence number RA NOM 332.10650464448 Nominal RA DEC NOM 45.718067658754 Nominal Dec ROLL NOM 167.05189870962 Nominal Roll

Summary Page Created:Sat September 30, 2006 10:18 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290222

Instrument: HRC Obs ID: 2666 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169862 45.742306 8130.875000 92.747078 87.667183 332.539409 45.685895 86.819641 20.172401 4.303882 332.528878 45.640260 73.906250 18.019602 4.101436 332.518578 45.602439 62.601788 17.016397 3.678910 332.508653 45.698899 62.208332 17.472746 3.560307 332.461368 45.647694 47.489655 15.165840 3.131357 332.530013 45.653465 59.625893 19.062021 3.127994