Summary Page Created:Tue September 19, 2006 15:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590241

Instrument: ACIS Obs ID: 2852 Source: E0102-72.3 [Chip S1, T=120, Offsets=13,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf02852N002 full img2.fits acisf02852N002 cntr img2.fits

Summary Page Created:Tue September 19, 2006 15:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590241

Instrument: ACIS Obs ID: 2852 Source: E0102-72.3 [Chip S1, T=120, Offsets=13,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T19:03:32 Date and time of file creation DATE-OBS 2002-06-19T21:17:56 Observation start date DATE-END 2002-06-19T23:45:19 Observation end date RA PNT 16.268340528087 Pointing RA DEC PNT -72.234551817248 Pointing Dec ROLL PNT 111.22639180222 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T19:32:11 Date and time of file creation DATE-OBS 2002-06-19T21:17:56 Observation start date DATE-END 2002-06-19T23:45:19 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S1, T=120, Offsets=13,0,0]

Source name

TITLE AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2852 Observation id SEQ NUM 590241 Sequence number RA NOM 16.268340528087 Nominal RA DEC NOM -72.234551817248 Nominal Dec ROLL NOM 111.22639180222 Nominal Roll

Summary Page Created:Tue September 19, 2006 15:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590241

Instrument: ACIS Obs ID: 2852 Source: E0102-72.3 [Chip S1, T=120, Offsets=13,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.011295 -72.031420 16643.695312 205.259567 81.086082 16.478542 -72.064641 78.113640 11.478631 6.805135 16.094863 -71.927380 174.342194 27.205227 6.408408 16.733665 -72.412772 84.694817 13.235012 6.399300 16.401662 -72.163436 55.875000 9.250197 6.040411 15.724239 -71.967823 130.073090 22.693596 5.731709 16.387619 -72.225309 45.000000 8.126118 5.537700 15.742655 -71.986706 140.023209 29.078804 4.815302 16.109184 -71.940205 132.995529 28.917183 4.599187 15.776230 -72.021658 105.738640 23.745014 4.453088