Summary Page Created:Wed September 20, 2006 20:26 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590245

Instrument: ACIS Obs ID: 2856 Source: E0102-72.3 [Chip S5, T=120, Offsets=-17,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf02856N002 full img2.fits acisf02856N002 cntr img2.fits

Summary Page Created:Wed September 20, 2006 20:26 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590245

Instrument: ACIS Obs ID: 2856 Source: E0102-72.3 [Chip S5, T=120, Offsets=-17,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T00:06:41 Date and time of file creation DATE-OBS 2002-06-22T13:31:54 Observation start date DATE-END 2002-06-22T16:04:32 Observation end date RA PNT 15.730613461067 Pointing RA DEC PNT -71.753020865922 Pointing Dec ROLL PNT 107.64353874201 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T00:25:05 Date and time of file creation DATE-OBS 2002-06-22T13:31:54 Observation start date DATE-END 2002-06-22T16:04:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S5, T=120, Offsets=-17,0,0]

Source name

TITLE AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2856 Observation id SEQ NUM 590245 Sequence number RA NOM 15.730613461067 Nominal RA DEC NOM -71.753020865922 Nominal Dec ROLL NOM 107.64353874201 Nominal Roll

Summary Page Created:Wed September 20, 2006 20:26 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590245

Instrument: ACIS Obs ID: 2856 Source: E0102-72.3 [Chip S5, T=120, Offsets=-17,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.005741 -72.030744 14548.472656 142.416595 102.154327 15.258105 -71.478587 165.292358 29.253481 5.650348 15.624059 -71.445699 151.375412 29.486568 5.133708 15.658049 -71.475148 120.083336 26.492132 4.532792 15.322350 -71.565054 86.215683 19.768633 4.361237 15.296559 -71.530395 104.056816 23.865316 4.360169 15.283712 -71.511979 118.791664 28.705181 4.138335 15.564995 -71.451630 141.601334 34.492725 4.105252 15.484028 -71.457855 136.893692 33.387642 4.100131 15.277006 -71.505336 118.213394 30.155161 3.920171