Summary Page Created:Wed November 21, 2007 18:14 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590263

Instrument: HRC Obs ID: 2874 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

hrcf02874N003 full img2.fits hrcf02874N003 cntr img2.fits

Summary Page Created:Wed November 21, 2007 18:14 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590263

Instrument: HRC Obs ID: 2874 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T22:40:31 Date and time of file creation DATE-OBS 2002-07-15T03:50:26 Observation start date DATE-END 2002-07-15T09:50:14 Observation end date RA PNT 278.38591466403 Pointing RA DEC PNT -10.570539449222 Pointing Dec ROLL PNT 232.06402859632 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T23:13:31 Date and time of file creation DATE-OBS 2002-07-15T03:50:26 Observation start date DATE-END 2002-07-15T09:50:14 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT G21.5-0.9 [HRC-I, Offsets=0,0,0] Source name TITLE AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2874 Observation id SEQ NUM 590263 Sequence number RA NOM 278.38591466403 Nominal RA DEC NOM -10.570539449222 Nominal Dec ROLL NOM 232.06402859632 Nominal Roll

Summary Page Created:Wed November 21, 2007 18:14 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590263

Instrument: HRC Obs ID: 2874 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389812 -10.568857 180.291672 31.125801 5.792354 278.629278 -10.781033 223.694351 41.209564 5.428215 278.115254 -10.387505 239.053162 44.109371 5.419555 278.663421 -10.739372 196.926910 36.453995 5.402067 278.368873 -10.402071 105.868965 20.282944 5.219605 278.659597 -10.699369 168.514282 32.499241 5.185176 278.118311 -10.434543 184.389282 36.776981 5.013715 278.594734 -10.792704 139.019638 30.282104 4.590818 278.550522 -10.297797 181.681061 39.930607 4.549920 278.199626 -10.836602 177.986710 39.766113 4.475839