Summary Page Created:Wed October 4, 2006 07:35 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590264

Instrument: HRC Obs ID: 2875 Source: G21.5-0.9 [HRC-S, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

hrcf02875N002 full img2.fitshrcf02875N002 cntr img2.fits

Summary Page Created:Wed October 4, 2006 07:35 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590264

Instrument: HRC Obs ID: 2875 Source: G21.5-0.9 [HRC-S, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-10-04T09:17:37 Date and time of file creation DATE-OBS 2002-09-13T16:05:57 Observation start date DATE-END 2002-09-13T21:57:25 Observation end date RA PNT 278.3893793455 Pointing RA DEC PNT -10.573309906862 Pointing Dec ROLL PNT 269.47598370129 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-10-04T11:32:03 Date and time of file creation DATE-OBS 2002-09-13T16:05:57 Observation start date DATE-END 2002-09-13T21:57:25 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT G21.5-0.9 [HRC-S, Offsets=0,0,0] Source name TITLE AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2875 Observation id SEQ NUM 590264 Sequence number RA NOM 278.3893793455 Nominal RA DEC NOM -10.573309906862 Nominal Dec ROLL NOM 269.47598370129 Nominal Roll

Summary Page Created:Wed October 4, 2006 07:35 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590264

Instrument: HRC Obs ID: 2875 Source: G21.5-0.9 [HRC-S, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.350287 -10.271178 1314.733032 78.457855 16.757189 278.415025 -10.270659 1135.523193 85.841263 13.228174 278.445650 -10.271176 781.226807 63.969002 12.212584 278.402218 -10.270826 1004.533020 87.112305 11.531471 278.389091 -10.270843 999.723206 87.564140 11.417039 278.376100 -10.270958 888.117859 86.261772 10.295613 278.344908 -10.818257 521.500000 55.255760 9.437930 278.427938 -10.270745 763.727661 82.425873 9.265631 278.344611 -10.314218 557.116211 61.410107 9.072061 278.446918 -10.297867 566.125000 64.938385 8.717879