Summary Page Created:Mon October 2, 2006 14:40 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590266

Instrument: ACIS Obs ID: 2877 Source: CAS A [Chip S3, T=120, Offsets=-2,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

acisf02877N002 full img2.fits acisf02877N002 cntr img2.fits

Summary Page Created:Mon October 2, 2006 14:40 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590266

Instrument: ACIS Obs ID: 2877 Source: CAS A [Chip S3, T=120, Offsets=-2,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-02T18:16:30 Date and time of file creation DATE-OBS 2002-08-30T16:10:48 Observation start date DATE-END 2002-08-30T17:03:40 Observation end date RA PNT 350.78790014048 Pointing RA DEC PNT 58.824814330233 Pointing Dec ROLL PNT 167.36906782952 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-02T18:38:45 Date and time of file creation DATE-OBS 2002-08-30T16:10:48 Observation start date DATE-END 2002-08-30T17:03:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT CAS A [Chip S3, T=120, Offsets=- 2,0,0]

Source name

TITLE AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2877 Observation id SEQ NUM 590266 Sequence number RA NOM 350.78790014048 Nominal RA DEC NOM 58.824814330233 Nominal Dec ROLL NOM 167.36906782952 Nominal Roll

Summary Page Created:Mon October 2, 2006 14:40 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590266

Instrument: ACIS Obs ID: 2877 Source: CAS A [Chip S3, T=120, Offsets=-2,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.881264 58.796490 281.897736 27.433208 10.275784 350.870686 58.828587 185.943176 21.537889 8.633306 350.885970 58.796608 275.545441 32.264507 8.540204 350.853382 58.840630 189.285721 26.075041 7.259268 350.952239 58.818177 141.227280 19.984110 7.066978 350.848635 58.840074 198.285721 29.773714 6.659757 350.888049 58.796463 284.142853 43.015064 6.605659 350.858109 58.801393 150.875000 23.321020 6.469485 350.926442 58.815947 291.875000 45.406265 6.428078 350.891572 58.832300 126.943184 20.032465 6.336873