Summary Page Created:Tue September 19, 2006 05:35 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 790078

Instrument: ACIS Obs ID: 3666 Source: A1795 PI: Dr. CXC Calibration Title: INVESTIGATING THE CONTAMINATION BUILD-UP ON ACIS

acisf03666N002 full img2.fits acisf03666N002 cntr img2.fits

Summary Page Created:Tue September 19, 2006 05:35 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 790078

Instrument: ACIS Obs ID: 3666 Source: A1795 PI: Dr. CXC Calibration Title: INVESTIGATING THE CONTAMINATION BUILD-UP ON ACIS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T09:16:32 Date and time of file creation DATE-OBS 2002-06-10T16:21:19 Observation start date DATE-END 2002-06-10T20:59:00 Observation end date RA PNT 207.20370411253 Pointing RA DEC PNT 26.575632997644 Pointing Dec ROLL PNT 231.7284856643 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T09:34:00 Date and time of file creation DATE-OBS 2002-06-10T16:21:19 Observation start date DATE-END 2002-06-10T20:59:00 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE INVESTIGATING THE CONTAMINATION BUILD- UP ON ACIS

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3666 Observation id SEQ NUM 790078 Sequence number RA NOM 207.20370411253 Nominal RA DEC NOM 26.575632997644 Nominal Dec ROLL NOM 231.7284856643 Nominal Roll

Summary Page Created:Tue September 19, 2006 05:35 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 790078

Instrument: ACIS Obs ID: 3666 Source: A1795 PI: Dr. CXC Calibration Title: INVESTIGATING THE CONTAMINATION BUILD-UP ON ACIS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.145636 26.519414 2337.285645 55.149094 42.381218 207.273992 26.630922 135.875000 15.298649 8.881503 207.100169 26.559131 69.477272 10.253065 6.776244 207.043368 26.300769 217.740860 34.692215 6.276361 206.941401 26.372253 221.677734 35.646343 6.218807 206.941204 26.682594 72.897728 14.017613 5.200438 207.168605 26.623583 46.715908 9.278037 5.035107 206.943721 26.683706 68.324135 14.141345 4.831516 206.965849 26.400138 165.916672 35.225506 4.710129 206.969867 26.352983 169.405319 37.110447 4.564896