Summary Page Created:Mon July 10, 2006 22:48 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590283

Instrument: ACIS Obs ID: 3528 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

acisf03528N002 full img2.fits acisf03528N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 22:48 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590283

Instrument: ACIS Obs ID: 3528 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:22:32 Date and time of file creation DATE-OBS 2003-08-09T01:19:37 Observation start date DATE-END 2003-08-09T04:00:57 Observation end date RA PNT 16.057585339031 Pointing RA DEC PNT -72.025274582082 Pointing Dec ROLL PNT 63.683617912923 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:47:13 Date and time of file creation DATE-OBS 2003-08-09T01:19:37 Observation start date DATE-END 2003-08-09T04:00:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-0.5,0.5,0] Source name TITLE AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3528 Observation id SEQ NUM 590283 Sequence number RA NOM 16.057585339031 Nominal RA DEC NOM -72.025274582082 Nominal Dec ROLL NOM 63.683617912923 Nominal Roll

Summary Page Created:Mon July 10, 2006 22:48 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590283

Instrument: ACIS Obs ID: 3528 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018810 -72.032650 201.142853 32.466572 6.195384 16.015833 -72.034843 190.857147 31.325962 6.092618 16.017773 -72.033766 195.142853 32.033134 6.091906 16.003504 -72.034833 180.285721 33.265736 5.419562 16.013250 -72.035358 150.000000 28.201054 5.318950 15.744670 -72.063260 40.000000 7.580717 5.276546 15.906332 -72.025973 44.428570 8.616951 5.155951 16.008176 -72.032337 108.428574 21.701895 4.996272 15.996474 -72.031271 150.571426 30.696667 4.905139 16.006178 -72.033761 111.142860 23.318081 4.766381