Summary Page Created:Tue July 11, 2006 12:13 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590284

Instrument: ACIS Obs ID: 3529 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

acisf03529N003 full img2.fits acisf03529N003 cntr img2.fits

Summary Page Created:Tue July 11, 2006 12:13 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590284

Instrument: ACIS Obs ID: 3529 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T16:02:10 Date and time of file creation DATE-OBS 2003-08-09T04:00:57 Observation start date DATE-END 2003-08-09T06:22:47 Observation end date RA PNT 16.238598439386 Pointing RA DEC PNT -71.988050826081 Pointing Dec ROLL PNT 63.762427504564 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T16:12:54 Date and time of file creation DATE-OBS 2003-08-09T04:00:57 Observation start date DATE-END 2003-08-09T06:22:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,2.5,0] Source name TITLE AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3529 Observation id SEQ NUM 590284 Sequence number RA NOM 16.238598439386 Nominal RA DEC NOM -71.988050826081 Nominal Dec ROLL NOM 63.762427504564 Nominal Roll

Summary Page Created:Tue July 11, 2006 12:13 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590284

Instrument: ACIS Obs ID: 3529 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.014892 -72.034920 704.416687 49.036606 14.365118 15.999434 -72.028306 704.000000 50.312523 13.992540 16.018610 -72.033570 701.458313 53.103619 13.209238 16.019049 -72.032805 556.142883 48.195038 11.539421 16.003628 -72.034882 599.208313 53.229237 11.257129 15.997030 -72.031538 556.291687 52.772968 10.541224 16.005870 -72.027521 394.791656 50.921844 7.752894 15.997317 -72.033564 368.041656 48.935413 7.520967 16.008025 -72.032237 260.041656 36.495163 7.125374 16.009831 -72.026850 276.857147 41.698715 6.639465