Summary Page Created:Tue July 11, 2006 00:04 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590289

Instrument: ACIS Obs ID: 3534 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

acisf03534N002 full img2.fits acisf03534N002 cntr img2.fits

Summary Page Created:Tue July 11, 2006 00:04 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590289

Instrument: ACIS Obs ID: 3534 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T03:36:43 Date and time of file creation DATE-OBS 2003-08-10T13:47:09 Observation start date DATE-END 2003-08-10T16:09:15 Observation end date RA PNT 16.020794119535 Pointing RA DEC PNT -72.117820070891 Pointing Dec ROLL PNT 61.999260173249 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T04:02:32 Date and time of file creation DATE-OBS 2003-08-10T13:47:09 Observation start date DATE-END 2003-08-10T16:09:15 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I2,-120,4.7,2.5,0] Source name TITLE AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3534 Observation id SEQ NUM 590289 Sequence number RA NOM 16.020794119535 Nominal RA DEC NOM -72.117820070891 Nominal Dec ROLL NOM 61.999260173249 Nominal Roll

Summary Page Created:Tue July 11, 2006 00:04 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590289

Instrument: ACIS Obs ID: 3534 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018682 -72.033075 816.000000 53.933861 15.129642 15.807871 -72.153985 269.571442 18.168863 14.837001 16.016389 -72.034399 757.250000 53.740849 14.090771 16.000717 -72.028274 641.083313 52.705036 12.163607 16.003067 -72.034938 670.250000 55.801155 12.011400 16.009370 -72.026985 564.375000 48.665485 11.597029 15.996548 -72.031625 536.416687 52.014679 10.312794 15.407109 -72.072579 184.000000 19.786797 9.299130 16.020403 -72.029609 363.875000 44.470577 8.182377 16.018116 -72.028293 305.666656 43.916271 6.960214