Summary Page Created:Mon July 10, 2006 23:55 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590299

Instrument: ACIS Obs ID: 3544 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf03544N002 full img2.fits acisf03544N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 23:55 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590299

Instrument: ACIS Obs ID: 3544 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T03:36:25 Date and time of file creation DATE-OBS 2003-08-10T16:09:15 Observation start date DATE-END 2003-08-10T19:04:01 Observation end date RA PNT 15.995163447097 Pointing RA DEC PNT -72.044015253648 Pointing Dec ROLL PNT 61.849692566944 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T03:54:12 Date and time of file creation DATE-OBS 2003-08-10T16:09:15 Observation start date DATE-END 2003-08-10T19:04:01 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,1,0,0] Source name TITLE AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3544 Observation id SEQ NUM 590299 Sequence number RA NOM 15.995163447097 Nominal RA DEC NOM -72.044015253648 Nominal Dec ROLL NOM 61.849692566944 Nominal Roll

Summary Page Created:Mon July 10, 2006 23:55 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590299

Instrument: ACIS Obs ID: 3544 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.808563 -72.154046 215.306824 17.612656 12.224551 16.015495 -72.034952 389.857147 45.254215 8.614825 16.019155 -72.032542 380.000000 46.865028 8.108391 15.999625 -72.028432 336.571442 44.196239 7.615386 16.003953 -72.034742 378.714294 50.175003 7.547867 16.017416 -72.033921 337.714294 46.887810 7.202603 16.002403 -72.034750 334.714294 47.081821 7.109204 16.008508 -72.032237 231.714279 32.859791 7.051606 15.996956 -72.031193 287.857147 43.095119 6.679576 16.020036 -72.031705 269.571442 42.156170 6.394590