Summary Page Created:Mon July 10, 2006 22:16 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590302

Instrument: ACIS Obs ID: 3547 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf03547N002 full img2.fits acisf03547N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 22:16 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590302

Instrument: ACIS Obs ID: 3547 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T01:53:56 Date and time of file creation DATE-OBS 2003-08-08T20:35:57 Observation start date DATE-END 2003-08-08T22:57:47 Observation end date RA PNT 15.896243823076 Pointing RA DEC PNT -72.106024801965 Pointing Dec ROLL PNT 63.644962009001 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:14:58 Date and time of file creation DATE-OBS 2003-08-08T20:35:57 Observation start date DATE-END 2003-08-08T22:57:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72[S2,-120,5.15,0,0] Source name TITLE AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3547 Observation id SEQ NUM 590302 Sequence number RA NOM 15.896243823076 Nominal RA DEC NOM -72.106024801965 Nominal Dec ROLL NOM 63.644962009001 Nominal Roll

Summary Page Created:Mon July 10, 2006 22:16 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590302

Instrument: ACIS Obs ID: 3547 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.807934 -72.153973 346.397736 20.001051 17.318975 16.018125 -72.033521 721.000000 58.657825 12.291625 16.000358 -72.028169 654.958313 54.850056 11.940887 16.008837 -72.027339 554.791687 53.987625 10.276275 16.016755 -72.034348 465.714294 52.088734 8.940787 16.004236 -72.034867 416.000000 52.586735 7.910740 16.020164 -72.030071 327.458344 48.280701 6.782386 16.008719 -72.032168 260.625000 40.248650 6.475373 15.997240 -72.031129 309.571442 51.270660 6.037984 16.502247 -71.856673 138.767441 23.103670 6.006294