Summary Page Created:Mon July 10, 2006 22:16 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590303

Instrument: ACIS Obs ID: 3548 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf03548N002 full img2.fits acisf03548N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 22:16 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590303

Instrument: ACIS Obs ID: 3548 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T01:54:48 Date and time of file creation DATE-OBS 2003-08-08T22:57:47 Observation start date DATE-END 2003-08-09T01:19:37 Observation end date RA PNT 16.238544166295 Pointing RA DEC PNT -71.892399154868 Pointing Dec ROLL PNT 63.976075536708 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:15:09 Date and time of file creation DATE-OBS 2003-08-08T22:57:47 Observation start date DATE-END 2003-08-09T01:19:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72[S4,-120,-9.15,0,0] Source name TITLE AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3548 Observation id SEQ NUM 590303 Sequence number RA NOM 16.238544166295 Nominal RA DEC NOM -71.892399154868 Nominal Dec ROLL NOM 63.976075536708 Nominal Roll

Summary Page Created:Mon July 10, 2006 22:16 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590303

Instrument: ACIS Obs ID: 3548 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.002453 -72.033533 3203.452393 111.697250 28.679781 16.002762 -72.028301 2343.270020 102.735001 22.808878 16.018645 -72.033431 1962.427490 91.753777 21.387976 16.014142 -72.028255 1660.114990 99.095680 16.752647 16.835138 -71.643684 139.156143 23.522736 5.915814 16.486410 -71.591742 98.857140 23.479233 4.210408 16.344592 -71.672599 56.400932 14.275451 3.950904 16.784855 -71.679592 84.625000 22.697519 3.728381 16.808354 -71.667060 86.791664 23.961317 3.622158 15.907811 -72.025700 32.103447 9.322992 3.443470