Summary Page Created:Fri November 23, 2007 14:00 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590310

Instrument: HRC Obs ID: 3698 Source: CAS A PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

hrcf03698N003 full img2.fits hrcf03698N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 14:00 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590310

Instrument: HRC Obs ID: 3698 Source: CAS A PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T18:42:18 Date and time of file creation DATE-OBS 2003-03-17T03:01:40 Observation start date DATE-END 2003-03-17T04:41:58 Observation end date RA PNT 350.86516951763 Pointing RA DEC PNT 58.813611719592 Pointing Dec ROLL PNT 6.2944119335739 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T18:58:18 Date and time of file creation DATE-OBS 2003-03-17T03:01:40 Observation start date DATE-END 2003-03-17T04:41:58 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT CAS A Source name TITLE AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3698 Observation id SEQ NUM 590310 Sequence number RA NOM 350.86516951763 Nominal RA DEC NOM 58.813611719592 Nominal Dec ROLL NOM 6.2944119335739 Nominal Roll

Summary Page Created:Fri November 23, 2007 14:00 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590310

Instrument: HRC Obs ID: 3698 Source: CAS A PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.848630 58.839984 357.045441 29.685766 12.027496 350.852942 58.840603 198.784088 25.285236 7.861666 350.866366 58.811793 92.333336 12.642942 7.303153 350.891485 58.832291 100.840912 17.284847 5.834064 350.863138 58.785250 73.545456 12.783303 5.753243 350.871514 58.840692 122.568184 21.429720 5.719542 350.881393 58.796426 122.791664 22.433733 5.473528 350.922033 58.812250 113.329544 21.065331 5.379908 350.870122 58.828639 88.333336 16.447365 5.370668 350.913486 58.803487 123.590912 23.064545 5.358480