Summary Page Created:Thu June 29, 2006 06:15 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590316

Instrument: ACIS Obs ID: 3704 Source: CAS A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

acisf03704N002 full img2.fits acisf03704N002 cntr img2.fits

Summary Page Created:Thu June 29, 2006 06:15 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590316

Instrument: ACIS Obs ID: 3704 Source: CAS A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-29T10:01:24 Date and time of file creation DATE-OBS 2003-10-19T09:41:23 Observation start date DATE-END 2003-10-19T10:45:11 Observation end date RA PNT 350.8008085743 Pointing RA DEC PNT 58.791758716733 Pointing Dec ROLL PNT 220.93560767963 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-29T10:13:42 Date and time of file creation DATE-OBS 2003-10-19T09:41:23 Observation start date DATE-END 2003-10-19T10:45:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT CAS A[S3,-120,-2.0,0,0] Source name TITLE AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3704 Observation id SEQ NUM 590316 Sequence number RA NOM 350.8008085743 Nominal RA DEC NOM 58.791758716733 Nominal Dec ROLL NOM 220.93560767963 Nominal Roll

Summary Page Created:Thu June 29, 2006 06:15 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590316

Instrument: ACIS Obs ID: 3704 Source: CAS A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.848366 58.840202 333.943176 35.679604 9.359498 350.888364 58.796697 298.931824 33.476555 8.929587 350.891490 58.834927 305.571442 34.818092 8.776226 350.886989 58.796732 309.340912 35.450527 8.725988 350.885486 58.796660 270.795441 31.549780 8.583117 350.870319 58.828686 196.090912 22.927198 8.552763 350.853095 58.840618 258.590912 31.641438 8.172540 350.857725 58.834403 212.454544 26.324106 8.070723 350.897019 58.834887 390.714294 50.085903 7.800883 350.891684 58.832670 210.714279 28.222290 7.466237