Summary Page Created:Sun June 4, 2006 02:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290330

Instrument: HRC Obs ID: 5057 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05057N002 full img2.fits hrcf05057N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 02:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290330

Instrument: HRC Obs ID: 5057 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T06:27:20 Date and time of file creation DATE-OBS 2004-02-02T11:21:06 Observation start date DATE-END 2004-02-02T12:04:38 Observation end date RA PNT 88.842074347942 Pointing RA DEC PNT 7.2426190352828 Pointing Dec ROLL PNT 286.60229877154 Pointing Roll RA TARG 88.792917 Observer’s specified target RA DEC TARG 7.407056 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T06:58:26 Date and time of file creation DATE-OBS 2004-02-02T11:21:06 Observation start date DATE-END 2004-02-02T12:04:38 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Betelgeuse Source name TITLE AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5057 Observation id SEQ NUM 290330 Sequence number RA NOM 88.842074347942 Nominal RA DEC NOM 7.2426190352828 Nominal Dec ROLL NOM 286.60229877154 Nominal Roll

Summary Page Created:Sun June 4, 2006 02:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290330

Instrument: HRC Obs ID: 5057 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 88.719060 7.525202 235.407150 32.336361 7.279952 88.764074 7.538711 222.804459 37.712822 5.907923 88.801539 7.550446 132.334824 26.726324 4.951478 88.744596 7.532402 171.108932 37.290752 4.588508 88.732468 7.531172 137.233932 32.798111 4.184202 88.776748 7.544225 141.700897 34.444618 4.113876 88.739152 7.436027 85.843857 21.799990 3.937793 88.891902 7.009034 97.745094 26.190420 3.732094 88.716904 7.491080 83.770630 24.446558 3.426684 88.916096 7.013705 88.823532 26.086887 3.404911