Summary Page Created:Fri November 23, 2007 20:12 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290335

Instrument: HRC Obs ID: 5062 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05062N003 full img2.fits hrcf05062N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 20:12 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290335

Instrument: HRC Obs ID: 5062 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T01:02:55 Date and time of file creation DATE-OBS 2004-09-13T21:25:25 Observation start date DATE-END 2004-09-13T21:39:48 Observation end date RA PNT 332.1468331043 Pointing RA DEC PNT 45.773838516859 Pointing Dec ROLL PNT 205.29917542693 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T01:11:45 Date and time of file creation DATE-OBS 2004-09-13T21:25:25 Observation start date DATE-END 2004-09-13T21:39:48 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5062 Observation id SEQ NUM 290335 Sequence number RA NOM 332.1468331043 Nominal RA DEC NOM 45.773838516859 Nominal Dec ROLL NOM 205.29917542693 Nominal Roll

Summary Page Created:Fri November 23, 2007 20:12 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290335

Instrument: HRC Obs ID: 5062 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170027 45.742370 1838.142822 46.143742 39.835148 332.307276 45.479033 65.192688 16.835913 3.872240 332.437836 45.589720 39.569229 10.686382 3.702771 332.441396 45.970982 43.291668 12.914598 3.352150 332.112845 46.054430 40.541668 12.216261 3.318664 331.734201 45.688430 46.854465 14.681520 3.191391 332.097223 45.588738 22.556818 7.334115 3.075602 332.158188 45.523668 40.041668 13.326304 3.004709