Summary Page Created:Fri November 23, 2007 22:24 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290347

Instrument: HRC Obs ID: 5074 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05074N003 full img2.fits hrcf05074N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 22:24 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290347

Instrument: HRC Obs ID: 5074 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T03:14:33 Date and time of file creation DATE-OBS 2004-11-25T18:20:11 Observation start date DATE-END 2004-11-25T18:43:41 Observation end date RA PNT 332.02902100496 Pointing RA DEC PNT 45.712472266749 Pointing Dec ROLL PNT 284.68827413433 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T03:22:59 Date and time of file creation DATE-OBS 2004-11-25T18:20:11 Observation start date DATE-END 2004-11-25T18:43:41 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5074 Observation id SEQ NUM 290347 Sequence number RA NOM 332.02902100496 Nominal RA DEC NOM 45.712472266749 Nominal Dec ROLL NOM 284.68827413433 Nominal Roll

Summary Page Created:Fri November 23, 2007 22:24 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290347

Instrument: HRC Obs ID: 5074 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169992 45.742343 4163.395020 68.597389 60.693199 331.578322 45.675304 65.269104 16.765266 3.893115 332.461186 45.823225 65.976746 18.843609 3.501280 332.365493 45.863922 52.416668 15.060427 3.480424 331.835915 45.982542 59.712502 17.169861 3.477751 331.843302 45.969298 62.750000 18.203882 3.447067 332.338357 45.879991 43.216782 12.682072 3.407707 332.016026 45.466967 45.041668 13.531852 3.328566 331.797307 45.766882 23.041380 7.377460 3.123213 331.839486 45.904478 33.176472 10.915097 3.039503