Summary Page Created:Fri November 23, 2007 23:09 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290353

Instrument: HRC Obs ID: 5080 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05080N003 full img2.fits hrcf05080N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 23:09 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290353

Instrument: HRC Obs ID: 5080 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T04:00:23 Date and time of file creation DATE-OBS 2004-11-25T20:41:11 Observation start date DATE-END 2004-11-25T21:04:40 Observation end date RA PNT 331.9983712623 Pointing RA DEC PNT 45.534051413693 Pointing Dec ROLL PNT 284.84077677483 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T04:08:10 Date and time of file creation DATE-OBS 2004-11-25T20:41:11 Observation start date DATE-END 2004-11-25T21:04:40 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5080 Observation id SEQ NUM 290353 Sequence number RA NOM 331.9983712623 Nominal RA DEC NOM 45.534051413693 Nominal Dec ROLL NOM 284.84077677483 Nominal Roll

Summary Page Created:Fri November 23, 2007 23:09 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290353

Instrument: HRC Obs ID: 5080 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169687 45.742371 3329.705811 63.228149 52.661762 332.450182 45.596132 35.013290 11.173939 3.133478 331.567017 45.507335 33.885715 11.211402 3.022433