Summary Page Created:Sun June 4, 2006 13:34 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290357

Instrument: HRC Obs ID: 5084 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05084N002 full img2.fits hrcf05084N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 13:34 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290357

Instrument: HRC Obs ID: 5084 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T16:50:13 Date and time of file creation DATE-OBS 2004-02-09T14:24:40 Observation start date DATE-END 2004-02-09T14:48:57 Observation end date RA PNT 332.22311445889 Pointing RA DEC PNT 45.734750075796 Pointing Dec ROLL PNT 349.40749311775 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T17:32:45 Date and time of file creation DATE-OBS 2004-02-09T14:24:40 Observation start date DATE-END 2004-02-09T14:48:57 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5084 Observation id SEQ NUM 290357 Sequence number RA NOM 332.22311445889 Nominal RA DEC NOM 45.734750075796 Nominal Dec ROLL NOM 349.40749311775 Nominal Roll

Summary Page Created:Sun June 4, 2006 13:34 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290357

Instrument: HRC Obs ID: 5084 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169852 45.742339 5153.143066 74.468727 69.198753 331.791972 45.797584 76.546425 17.332579 4.416332 331.781643 45.742691 64.854462 15.335562 4.229024 331.886129 45.831933 51.372414 14.031960 3.661101 332.553379 45.646411 48.166668 13.393173 3.596359 331.815240 45.836828 63.432144 18.786659 3.376446 331.852782 45.837430 44.923077 14.051409 3.197052 331.789662 45.766697 59.459820 18.728237 3.174876 331.799443 45.824198 57.210712 18.155897 3.151082 331.852890 45.837542 42.852272 13.682267 3.131957