Summary Page Created:Sun June 4, 2006 16:04 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290368

Instrument: HRC Obs ID: 5095 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05095N002 full img2.fits hrcf05095N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 16:04 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290368

Instrument: HRC Obs ID: 5095 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T19:28:24 Date and time of file creation DATE-OBS 2004-02-09T18:51:37 Observation start date DATE-END 2004-02-09T19:15:52 Observation end date RA PNT 332.27000688617 Pointing RA DEC PNT 45.728074300285 Pointing Dec ROLL PNT 349.54844214852 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T20:02:43 Date and time of file creation DATE-OBS 2004-02-09T18:51:37 Observation start date DATE-END 2004-02-09T19:15:52 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5095 Observation id SEQ NUM 290368 Sequence number RA NOM 332.27000688617 Nominal RA DEC NOM 45.728074300285 Nominal Dec ROLL NOM 349.54844214852 Nominal Roll

Summary Page Created:Sun June 4, 2006 16:04 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290368

Instrument: HRC Obs ID: 5095 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169848 45.742322 5123.856934 75.023857 68.296371 332.170078 45.742372 933.835022 73.368118 12.728076 331.846100 45.824047 79.823212 18.022673 4.429044 331.828482 45.740811 74.906250 18.049410 4.150066 331.839876 45.797939 60.767857 17.324074 3.507712 331.858933 45.733831 61.916668 17.922667 3.454657 331.854410 45.833658 53.131248 15.606634 3.404402 331.829634 45.752582 59.155357 18.098896 3.268451 331.838041 45.785481 54.099998 17.831451 3.033965 332.601948 45.636455 34.708332 11.531531 3.009863