Summary Page Created:Sun June 4, 2006 16:42 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290373

Instrument: HRC Obs ID: 5100 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05100N002 full img2.fits hrcf05100N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 16:42 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290373

Instrument: HRC Obs ID: 5100 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T20:07:09 Date and time of file creation DATE-OBS 2004-02-09T20:52:56 Observation start date DATE-END 2004-02-09T21:17:13 Observation end date RA PNT 331.933670565 Pointing RA DEC PNT 45.739069335957 Pointing Dec ROLL PNT 350.00543979873 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T20:41:01 Date and time of file creation DATE-OBS 2004-02-09T20:52:56 Observation start date DATE-END 2004-02-09T21:17:13 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5100 Observation id SEQ NUM 290373 Sequence number RA NOM 331.933670565 Nominal RA DEC NOM 45.739069335957 Nominal Dec ROLL NOM 350.00543979873 Nominal Roll

Summary Page Created:Sun June 4, 2006 16:42 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290373

Instrument: HRC Obs ID: 5100 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169383 45.742946 2747.872559 62.184784 44.188824 332.170072 45.742847 2654.379395 61.510487 43.153282 332.166986 45.730984 182.414993 20.282627 8.993658 332.165828 45.726972 111.312500 18.387737 6.053627 332.162248 45.710802 93.875000 15.982654 5.873555 331.493192 45.750629 82.269646 16.900974 4.867746 332.156615 45.690433 57.232498 12.459413 4.593515 331.510455 45.834349 82.989288 18.458168 4.496074 331.537663 45.837878 64.916664 18.012625 3.603954 332.291233 45.750868 33.916668 10.945362 3.098725