Summary Page Created:Mon April 10, 2006 15:55 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290375

Instrument: HRC Obs ID: 5102 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05102N002 full img2.fits hrcf05102N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 15:55 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290375

Instrument: HRC Obs ID: 5102 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:20:05 Date and time of file creation DATE-OBS 2004-11-28T05:42:35 Observation start date DATE-END 2004-11-28T06:15:16 Observation end date RA PNT 332.17091867883 Pointing RA DEC PNT 45.737602997955 Pointing Dec ROLL PNT 286.83399556512 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:53:35 Date and time of file creation DATE-OBS 2004-11-28T05:42:35 Observation start date DATE-END 2004-11-28T06:15:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5102 Observation id SEQ NUM 290375 Sequence number RA NOM 332.17091867883 Nominal RA DEC NOM 45.737602997955 Nominal Dec ROLL NOM 286.83399556512 Nominal Roll

Summary Page Created:Mon April 10, 2006 15:55 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290375

Instrument: HRC Obs ID: 5102 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169865 45.742410 4567.000000 71.371330 63.989281 332.003234 46.020704 95.068748 20.839050 4.562048 332.233851 45.497111 62.166668 15.860564 3.919575 332.113477 46.044523 68.878571 17.810484 3.867305 331.986670 46.019076 70.515175 19.150803 3.682101 332.136212 45.994701 63.668964 17.435654 3.651654 332.051655 46.033278 70.207146 20.446419 3.433713 332.126321 46.024077 61.791668 19.580219 3.155821 332.143998 45.984142 46.166668 15.301306 3.017172