Summary Page Created:Mon April 10, 2006 16:05 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290380

Instrument: HRC Obs ID: 5107 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05107N002 full img2.fits hrcf05107N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:05 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290380

Instrument: HRC Obs ID: 5107 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:31:06 Date and time of file creation DATE-OBS 2004-11-28T07:49:16 Observation start date DATE-END 2004-11-28T08:12:47 Observation end date RA PNT 332.20443516202 Pointing RA DEC PNT 45.779532145142 Pointing Dec ROLL PNT 286.88677918864 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:03:23 Date and time of file creation DATE-OBS 2004-11-28T07:49:16 Observation start date DATE-END 2004-11-28T08:12:47 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5107 Observation id SEQ NUM 290380 Sequence number RA NOM 332.20443516202 Nominal RA DEC NOM 45.779532145142 Nominal Dec ROLL NOM 286.88677918864 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:05 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290380

Instrument: HRC Obs ID: 5107 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169996 45.742302 4588.571289 71.336060 64.323311 332.144954 46.087133 91.075890 16.746277 5.438576 332.012221 46.056243 86.044640 18.658424 4.611570 332.037758 46.062634 99.203575 22.863703 4.338911 332.027333 46.018317 55.282990 16.476139 3.355337 332.317441 45.547182 52.625000 16.481333 3.193006 332.112044 46.081106 64.151787 20.185781 3.178068 332.159565 46.065987 60.958332 19.320766 3.155068 332.350752 45.593420 42.950165 14.221497 3.020087