Summary Page Created:Mon April 10, 2006 16:46 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290386

Instrument: HRC Obs ID: 5113 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05113N002 full img2.fits hrcf05113N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:46 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290386

Instrument: HRC Obs ID: 5113 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:41:24 Date and time of file creation DATE-OBS 2004-11-28T10:10:16 Observation start date DATE-END 2004-11-28T10:33:46 Observation end date RA PNT 332.13085948025 Pointing RA DEC PNT 45.833631441179 Pointing Dec ROLL PNT 287.00987731443 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:44:29 Date and time of file creation DATE-OBS 2004-11-28T10:10:16 Observation start date DATE-END 2004-11-28T10:33:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5113 Observation id SEQ NUM 290386 Sequence number RA NOM 332.13085948025 Nominal RA DEC NOM 45.833631441179 Nominal Dec ROLL NOM 287.00987731443 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:46 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290386

Instrument: HRC Obs ID: 5113 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169923 45.742351 5665.602051 79.420784 71.336517 331.945836 46.110583 167.763397 32.763653 5.120412 332.218437 45.597496 129.083328 26.670189 4.839986 332.019044 46.128962 175.883926 38.096210 4.616836 332.169529 45.588871 89.458336 20.768000 4.307508 331.964163 46.116034 146.503571 35.346382 4.144797 332.064296 46.140139 103.532143 25.003040 4.140782 332.110763 45.975616 52.818180 13.134107 4.021452 332.036825 46.134787 124.400002 32.777470 3.795290 332.003905 45.965087 44.924999 12.229930 3.673365