Summary Page Created:Mon April 10, 2006 17:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290390

Instrument: HRC Obs ID: 5117 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05117N002 full img2.fits hrcf05117N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 17:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290390

Instrument: HRC Obs ID: 5117 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:49:01 Date and time of file creation DATE-OBS 2004-11-28T11:44:16 Observation start date DATE-END 2004-11-28T12:07:46 Observation end date RA PNT 332.21461173066 Pointing RA DEC PNT 45.642392209945 Pointing Dec ROLL PNT 287.05477514205 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:58:23 Date and time of file creation DATE-OBS 2004-11-28T11:44:16 Observation start date DATE-END 2004-11-28T12:07:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5117 Observation id SEQ NUM 290390 Sequence number RA NOM 332.21461173066 Nominal RA DEC NOM 45.642392209945 Nominal Dec ROLL NOM 287.05477514205 Nominal Roll

Summary Page Created:Mon April 10, 2006 17:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290390

Instrument: HRC Obs ID: 5117 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170009 45.742452 4271.092285 70.788094 60.336308 332.387401 45.431423 78.625000 15.606021 5.038119 332.038706 45.924558 96.290176 21.260771 4.529007 332.157397 45.949622 73.740181 17.664053 4.174590 332.371847 45.477828 38.333332 9.991239 3.836695 332.170754 45.922984 65.625000 18.477335 3.551649 332.075227 45.931342 71.400894 20.826410 3.428382 332.212580 45.845656 31.470535 9.455518 3.328272 332.057495 45.926014 70.092857 21.992435 3.187135 332.139699 45.945436 63.677677 21.120195 3.015014