Summary Page Created:Fri November 23, 2007 19:29 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290439

Instrument: HRC Obs ID: 5342 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

hrcf05342N003 full img2.fits hrcf05342N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 19:29 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290439

Instrument: HRC Obs ID: 5342 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T00:16:05 Date and time of file creation DATE-OBS 2004-08-28T14:00:14 Observation start date DATE-END 2004-08-28T15:25:07 Observation end date RA PNT 279.23095260025 Pointing RA DEC PNT 38.781302523127 Pointing Dec ROLL PNT 241.38267505358 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T00:28:22 Date and time of file creation DATE-OBS 2004-08-28T14:00:14 Observation start date DATE-END 2004-08-28T15:25:07 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Vega Source name TITLE Monitoring the health of the HRC UV Ion shield

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5342 Observation id SEQ NUM 290439 Sequence number RA NOM 279.23095260025 Nominal RA DEC NOM 38.781302523127 Nominal Dec ROLL NOM 241.38267505358 Nominal Roll

Summary Page Created:Fri November 23, 2007 19:29 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290439

Instrument: HRC Obs ID: 5342 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.850536 38.933355 90.886307 23.158792 3.924484 279.605620 38.675181 63.345516 16.629282 3.809275 279.040459 38.939780 40.936878 11.579785 3.535202 279.188544 38.895060 23.020689 6.826312 3.372346 278.956004 38.770219 36.936878 11.384593 3.244462 279.579839 38.606893 51.498341 16.085653 3.201507 279.098533 38.499547 55.127678 17.920679 3.076205 278.966940 38.868501 36.593086 11.955491 3.060776 279.563308 38.605920 54.435215 18.112585 3.005381