Summary Page Created:Wed April 26, 2006 09:52 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290440

Instrument: HRC Obs ID: 5343 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

hrcf05343N002 full img2.fits hrcf05343N002 cntr img2.fits

Summary Page Created:Wed April 26, 2006 09:52 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290440

Instrument: HRC Obs ID: 5343 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-04-26T12:38:14 Date and time of file creation DATE-OBS 2004-08-05T11:25:43 Observation start date DATE-END 2004-08-05T12:36:27 Observation end date RA PNT 279.23048491167 Pointing RA DEC PNT 38.780683833687 Pointing Dec ROLL PNT 218.90009712273 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-04-26T13:50:39 Date and time of file creation DATE-OBS 2004-08-05T11:25:43 Observation start date DATE-END 2004-08-05T12:36:27 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE Monitoring the health of the HRC UV Ion shield

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5343 Observation id SEQ NUM 290440 Sequence number RA NOM 279.23048491167 Nominal RA DEC NOM 38.780683833687 Nominal Dec ROLL NOM 218.90009712273 Nominal Roll

Summary Page Created:Wed April 26, 2006 09:52 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290440

Instrument: HRC Obs ID: 5343 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235135 38.784133 210.000000 21.781128 9.641374 279.495698 39.005071 205.265182 32.808964 6.256375 279.568640 38.929267 178.261612 33.472939 5.325544 279.517923 38.992047 152.241074 30.771759 4.947428 279.561219 38.947584 153.562500 34.478565 4.453854 278.955839 38.662059 98.833336 25.275883 3.910183 278.995563 38.614847 81.250000 22.108494 3.675058 279.531207 38.905291 98.850807 27.731361 3.564585 279.419923 38.931763 69.448502 20.179564 3.441527 279.056259 38.675167 45.331036 13.302382 3.407738