Summary Page Created:Fri November 23, 2007 20:16 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290443

Instrument: HRC Obs ID: 5346 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

hrcf05346N003 full img2.fits hrcf05346N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 20:16 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290443

Instrument: HRC Obs ID: 5346 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T01:02:36 Date and time of file creation DATE-OBS 2004-11-07T02:29:55 Observation start date DATE-END 2004-11-07T03:42:38 Observation end date RA PNT 279.23584767744 Pointing RA DEC PNT 38.779662142439 Pointing Dec ROLL PNT 304.29555147595 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T01:14:53 Date and time of file creation DATE-OBS 2004-11-07T02:29:55 Observation start date DATE-END 2004-11-07T03:42:38 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Vega Source name TITLE Monitoring the health of the HRC UV Ion shield

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5346 Observation id SEQ NUM 290443 Sequence number RA NOM 279.23584767744 Nominal RA DEC NOM 38.779662142439 Nominal Dec ROLL NOM 304.29555147595 Nominal Roll

Summary Page Created:Fri November 23, 2007 20:16 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290443

Instrument: HRC Obs ID: 5346 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.944321 38.943143 107.500000 23.612120 4.552747 279.045341 39.059669 135.471756 30.694834 4.413504 279.573071 38.869309 92.068184 22.580826 4.077272 279.497813 38.561917 95.701782 23.575396 4.059392 279.402654 39.008287 81.169357 20.596165 3.940994 278.954927 38.573917 107.331253 27.583607 3.891124 279.595013 38.955526 110.518616 28.593796 3.865126 278.950753 38.942828 92.083916 23.903740 3.852281 279.400407 38.505397 89.978569 23.877489 3.768343 279.029570 39.065848 108.450798 28.779909 3.768281