Summary Page Created:Tue June 6, 2006 15:49 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 890026

Instrument: ACIS Obs ID: 5286 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

acisf05286N002 full img2.fits acisf05286N002 cntr img2.fits

Summary Page Created:Tue June 6, 2006 15:49 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 890026

Instrument: ACIS Obs ID: 5286 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T19:08:50 Date and time of file creation DATE-OBS 2004-01-14T11:49:11 Observation start date DATE-END 2004-01-14T16:16:01 Observation end date RA PNT 207.22925861136 Pointing RA DEC PNT 26.609707057922 Pointing Dec ROLL PNT 70.118138215157 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T19:48:19 Date and time of file creation DATE-OBS 2004-01-14T11:49:11 Observation start date DATE-END 2004-01-14T16:16:01 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5286 Observation id SEQ NUM 890026 Sequence number RA NOM 207.22925861136 Nominal RA DEC NOM 26.609707057922 Nominal Dec ROLL NOM 70.118138215157 Nominal Roll

Summary Page Created:Tue June 6, 2006 15:49 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 890026

Instrument: ACIS Obs ID: 5286 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.465983 26.857132 361.015289 36.897137 9.784371 207.390470 26.883050 203.485046 32.773773 6.208777 207.312891 26.838980 168.041672 27.467443 6.117849 207.412488 26.703007 73.833336 13.001478 5.678842 207.332199 26.885741 177.324112 31.290646 5.667000 207.461506 26.833236 184.837204 35.469044 5.211226 207.448016 26.797440 149.443176 28.935997 5.164611 207.340382 26.900306 133.730896 26.765684 4.996356 207.328502 26.871437 150.875000 32.671242 4.617976 207.269784 26.499999 58.241379 12.733956 4.573706