Summary Page Created:Tue June 6, 2006 16:55 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 890028

Instrument: ACIS Obs ID: 5288 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

acisf05288N002 full img2.fits acisf05288N002 cntr img2.fits

Summary Page Created:Tue June 6, 2006 16:55 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 890028

Instrument: ACIS Obs ID: 5288 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T20:01:37 Date and time of file creation DATE-OBS 2004-01-16T06:15:25 Observation start date DATE-END 2004-01-16T10:52:18 Observation end date RA PNT 207.22883390337 Pointing RA DEC PNT 26.6098240025 Pointing Dec ROLL PNT 71.182248427421 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T20:54:09 Date and time of file creation DATE-OBS 2004-01-16T06:15:25 Observation start date DATE-END 2004-01-16T10:52:18 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5288 Observation id SEQ NUM 890028 Sequence number RA NOM 207.22883390337 Nominal RA DEC NOM 26.6098240025 Nominal Dec ROLL NOM 71.182248427421 Nominal Roll

Summary Page Created:Tue June 6, 2006 16:55 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 890028

Instrument: ACIS Obs ID: 5288 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.145767 26.519395 5330.565430 80.963905 65.838791 207.213827 26.934407 285.874329 33.498833 8.533860 207.344261 26.897233 281.478394 33.538555 8.392681 207.085335 26.538953 117.295456 15.950707 7.353621 207.258849 26.785155 131.318176 18.518700 7.091113 207.202081 26.904220 204.136612 37.773304 5.404256 207.314423 26.836008 157.215683 29.551304 5.320093 207.301529 26.910132 197.405319 37.499779 5.264173 207.332040 26.856624 150.590912 29.808729 5.051906 207.287635 26.911457 195.229233 40.651676 4.802489