Summary Page Created:Tue June 6, 2006 18:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 890029

Instrument: ACIS Obs ID: 5289 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

acisf05289N003 full img2.fits acisf05289N003 cntr img2.fits

Summary Page Created:Tue June 6, 2006 18:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 890029

Instrument: ACIS Obs ID: 5289 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T21:49:27 Date and time of file creation DATE-OBS 2004-01-18T14:46:36 Observation start date DATE-END 2004-01-18T19:34:28 Observation end date RA PNT 207.2293676385 Pointing RA DEC PNT 26.612487000866 Pointing Dec ROLL PNT 72.664473256737 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T22:26:28 Date and time of file creation DATE-OBS 2004-01-18T14:46:36 Observation start date DATE-END 2004-01-18T19:34:28 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01237 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5289 Observation id SEQ NUM 890029 Sequence number RA NOM 207.2293676385 Nominal RA DEC NOM 26.612487000866 Nominal Dec ROLL NOM 72.664473256737 Nominal Roll

Summary Page Created:Tue June 6, 2006 18:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 890029

Instrument: ACIS Obs ID: 5289 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.145565 26.519423 1744.358643 44.157261 39.503326 206.942023 26.681347 264.170441 35.386745 7.465238 206.926295 26.718155 172.950897 25.604073 6.754820 206.885969 26.599497 203.235886 31.455675 6.461024 207.411840 26.703841 78.545456 12.996075 6.043783 207.084624 26.538781 69.829544 11.879992 5.877912 206.908107 26.666062 157.573212 31.250204 5.042310 206.899943 26.636070 176.839279 35.113350 5.036241 206.973177 26.571291 102.333336 20.348841 5.028952 206.913489 26.678221 166.261612 33.285873 4.994960