Summary Page Created:Mon February 27, 2006 10:55 EST page: 1 of 3

Chandra X-ray Center Seq Num: 890031

Instrument: ACIS Obs ID: 6159 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

acisf06159N002 full img2.fits acisf06159N002 cntr img2.fits

Summary Page Created:Mon February 27, 2006 10:55 EST page: 2 of 3

Chandra X-ray Center Seq Num: 890031

Instrument: ACIS Obs ID: 6159 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T15:32:40 Date and time of file creation DATE-OBS 2005-03-20T07:50:19 Observation start date DATE-END 2005-03-20T12:21:57 Observation end date RA PNT 207.13695253194 Pointing RA DEC PNT 26.679285125169 Pointing Dec ROLL PNT 130.9812198463 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T15:54:17 Date and time of file creation DATE-OBS 2005-03-20T07:50:19 Observation start date DATE-END 2005-03-20T12:21:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6159 Observation id SEQ NUM 890031 Sequence number RA NOM 207.13695253194 Nominal RA DEC NOM 26.679285125169 Nominal Dec ROLL NOM 130.9812198463 Nominal Roll

Summary Page Created:Mon February 27, 2006 10:55 EST page: 3 of 3

Chandra X-ray Center Seq Num: 890031

Instrument: ACIS Obs ID: 6159 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.145826 26.518809 1340.442505 41.038013 32.663437 207.065746 26.744466 94.833336 11.475794 8.263771 206.940581 26.680862 122.213791 14.931964 8.184710 207.002182 26.713640 80.636360 11.039217 7.304536 207.218279 26.593141 241.020004 44.992279 5.356919 206.887218 26.661590 67.536568 13.734658 4.917237 207.220012 26.591792 226.413788 52.815586 4.286875 207.100081 26.558782 28.954546 8.498066 3.407192 206.811823 26.539107 52.651161 15.970892 3.296695 207.040832 26.755619 22.020689 6.738201 3.268037