Summary Page Created:Mon February 27, 2006 10:47 EST page: 1 of 3

Chandra X-ray Center Seq Num: 890032

Instrument: ACIS Obs ID: 6160 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

acisf06160N002 full img2.fits acisf06160N002 cntr img2.fits

Summary Page Created:Mon February 27, 2006 10:47 EST page: 2 of 3

Chandra X-ray Center Seq Num: 890032

Instrument: ACIS Obs ID: 6160 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T15:27:16 Date and time of file creation DATE-OBS 2005-03-20T12:21:57 Observation start date DATE-END 2005-03-20T17:07:49 Observation end date RA PNT 207.20585277204 Pointing RA DEC PNT 26.607532185033 Pointing Dec ROLL PNT 131.08239379403 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.92967224 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T15:46:36 Date and time of file creation DATE-OBS 2005-03-20T12:21:57 Observation start date DATE-END 2005-03-20T17:07:49 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6160 Observation id SEQ NUM 890032 Sequence number RA NOM 207.20585277204 Nominal RA DEC NOM 26.607532185033 Nominal Dec ROLL NOM 131.08239379403 Nominal Roll

Summary Page Created:Mon February 27, 2006 10:47 EST page: 3 of 3

Chandra X-ray Center Seq Num: 890032

Instrument: ACIS Obs ID: 6160 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.258412 26.784207 153.909088 15.316191 10.048783 207.036217 26.875087 386.863800 39.854370 9.706935 207.274127 26.630843 124.795456 13.208979 9.447775 207.065454 26.745197 243.863632 26.239336 9.293818 207.067393 26.843852 272.295441 37.444710 7.271934 206.934721 26.797228 279.597992 40.839775 6.846218 207.312883 26.837229 88.500000 16.164930 5.474815 206.931763 26.789391 168.652679 32.655273 5.164638 207.015622 26.862501 218.594681 44.027325 4.964978 206.964221 26.756382 146.909088 29.868452 4.918537