Summary Page Created:Fri March 17, 2006 13:16 EST page: 1 of 3

Chandra X-ray Center Seq Num: 890033

Instrument: ACIS Obs ID: 6161 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

acisf06161N002 full img2.fits acisf06161N002 cntr img2.fits

Summary Page Created:Fri March 17, 2006 13:16 EST page: 2 of 3

Chandra X-ray Center Seq Num: 890033

Instrument: ACIS Obs ID: 6161 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T17:28:49 Date and time of file creation DATE-OBS 2005-03-28T04:15:30 Observation start date DATE-END 2005-03-28T08:29:47 Observation end date RA PNT 207.33106532379 Pointing RA DEC PNT 26.51816892201 Pointing Dec ROLL PNT 143.275246325 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T18:15:10 Date and time of file creation DATE-OBS 2005-03-28T04:15:30 Observation start date DATE-END 2005-03-28T08:29:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6161 Observation id SEQ NUM 890033 Sequence number RA NOM 207.33106532379 Nominal RA DEC NOM 26.51816892201 Nominal Dec ROLL NOM 143.275246325 Nominal Roll

Summary Page Created:Fri March 17, 2006 13:16 EST page: 3 of 3

Chandra X-ray Center Seq Num: 890033

Instrument: ACIS Obs ID: 6161 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.146030 26.518791 1745.068970 46.552490 37.486050 207.219471 26.593121 277.636353 49.476845 5.611441 207.201237 26.372726 62.590908 11.268506 5.554499 207.262557 26.473848 50.857143 9.461879 5.374952 207.270337 26.499354 39.159092 7.852385 4.986904 207.219528 26.589560 201.159088 51.751709 3.887004 207.081415 26.287684 68.435219 18.524137 3.694381 207.192089 26.586855 68.818184 18.978477 3.626117 207.362001 26.461563 21.000000 5.918404 3.548254 207.367844 26.403820 22.013794 6.532179 3.370054