Summary Page Created:Thu February 23, 2006 19:55 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290458

Instrument: HRC Obs ID: 5966 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05966N002 full img2.fits hrcf05966N002 cntr img2.fits

Summary Page Created:Thu February 23, 2006 19:55 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290458

Instrument: HRC Obs ID: 5966 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-24T00:29:34 Date and time of file creation DATE-OBS 2005-02-21T00:14:46 Observation start date DATE-END 2005-02-21T00:56:33 Observation end date RA PNT 279.23816426145 Pointing RA DEC PNT 38.787729746885 Pointing Dec ROLL PNT 58.490023782526 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-24T00:53:31 Date and time of file creation DATE-OBS 2005-02-21T00:14:46 Observation start date DATE-END 2005-02-21T00:56:33 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5966 Observation id SEQ NUM 290458 Sequence number RA NOM 279.23816426145 Nominal RA DEC NOM 38.787729746885 Nominal Dec ROLL NOM 58.490023782526 Nominal Roll

Summary Page Created:Thu February 23, 2006 19:55 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290458

Instrument: HRC Obs ID: 5966 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235088 38.784056 159.541672 18.309158 8.713763 279.081498 38.506219 139.556244 27.167479 5.136886 279.003202 38.586500 118.318878 23.933733 4.943604 278.983974 38.550422 110.559822 25.191153 4.388835 278.999178 38.543308 118.109825 27.495516 4.295603 279.095095 38.518506 115.708336 27.774351 4.166014 279.040546 38.524859 117.746429 28.320892 4.157582 279.334152 39.009174 80.882355 20.482901 3.948774 278.990439 38.562470 110.244644 28.818659 3.825461 279.132172 38.562366 67.294121 19.355104 3.476815