Summary Page Created:Thu February 23, 2006 20:01 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290459

Instrument: HRC Obs ID: 5967 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05967N002 full img2.fits hrcf05967N002 cntr img2.fits

Summary Page Created:Thu February 23, 2006 20:01 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290459

Instrument: HRC Obs ID: 5967 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-24T00:30:01 Date and time of file creation DATE-OBS 2005-02-21T00:56:33 Observation start date DATE-END 2005-02-21T01:38:23 Observation end date RA PNT 279.35078367906 Pointing RA DEC PNT 38.929418396348 Pointing Dec ROLL PNT 58.391599213685 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-24T00:59:07 Date and time of file creation DATE-OBS 2005-02-21T00:56:33 Observation start date DATE-END 2005-02-21T01:38:23 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5967 Observation id SEQ NUM 290459 Sequence number RA NOM 279.35078367906 Nominal RA DEC NOM 38.929418396348 Nominal Dec ROLL NOM 58.391599213685 Nominal Roll

Summary Page Created:Thu February 23, 2006 20:01 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290459

Instrument: HRC Obs ID: 5967 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235714 38.783681 271128.562500 545.216492 497.286072 279.199878 38.647633 120.065178 23.121719 5.192744 279.095322 38.692290 114.867859 24.254595 4.735922 279.143754 38.672330 118.275894 27.718271 4.267073 279.536922 39.126656 75.166664 19.416977 3.871183 279.257239 38.716666 61.858379 17.808420 3.473547 279.256260 38.725386 63.594685 19.095932 3.330274 279.554594 39.117433 63.791668 19.634884 3.248894 279.162009 38.660329 80.196426 25.480991 3.147304 279.323810 38.809796 24.795454 7.940438 3.122681