Summary Page Created:Tue February 21, 2006 17:10 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290463

Instrument: HRC Obs ID: 5971 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05971N002 full img2.fits hrcf05971N002 cntr img2.fits

Summary Page Created:Tue February 21, 2006 17:10 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290463

Instrument: HRC Obs ID: 5971 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-21T21:41:40 Date and time of file creation DATE-OBS 2005-02-02T19:27:21 Observation start date DATE-END 2005-02-02T20:09:10 Observation end date RA PNT 88.793894372699 Pointing RA DEC PNT 7.4025138557065 Pointing Dec ROLL PNT 285.9012543717 Pointing Roll RA TARG 88.792917 Observer’s specified target RA DEC TARG 7.407056 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-21T22:08:18 Date and time of file creation DATE-OBS 2005-02-02T19:27:21 Observation start date DATE-END 2005-02-02T20:09:10 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Betelgeuse Source name TITLE AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5971 Observation id SEQ NUM 290463 Sequence number RA NOM 88.793894372699 Nominal RA DEC NOM 7.4025138557065 Nominal Dec ROLL NOM 285.9012543717 Nominal Roll

Summary Page Created:Tue February 21, 2006 17:10 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290463

Instrument: HRC Obs ID: 5971 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 88.759668 7.705367 159.085709 26.910252 5.911714 88.665369 7.684421 136.452682 24.093616 5.663437 88.789039 7.501119 34.079544 7.299297 4.668880 88.672709 7.650974 101.338463 23.508976 4.310628 88.735555 7.704310 114.694641 26.871508 4.268262 88.768470 7.683197 101.625000 24.472130 4.152683 88.696407 7.692636 111.718750 28.173279 3.965415 88.908203 7.184073 75.916664 19.789368 3.836235 88.671467 7.655183 95.416664 25.648142 3.720217 88.715715 7.698310 103.857140 28.206007 3.682093