Summary Page Created:Tue February 21, 2006 17:13 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290464

Instrument: HRC Obs ID: 5972 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05972N002 full img2.fits hrcf05972N002 cntr img2.fits

Summary Page Created:Tue February 21, 2006 17:13 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290464

Instrument: HRC Obs ID: 5972 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-21T21:44:02 Date and time of file creation DATE-OBS 2005-02-02T20:09:10 Observation start date DATE-END 2005-02-02T20:51:01 Observation end date RA PNT 88.840536028237 Pointing RA DEC PNT 7.2423740476812 Pointing Dec ROLL PNT 286.0340138362 Pointing Roll RA TARG 88.792917 Observer’s specified target RA DEC TARG 7.407056 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-21T22:11:36 Date and time of file creation DATE-OBS 2005-02-02T20:09:10 Observation start date DATE-END 2005-02-02T20:51:01 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Betelgeuse Source name TITLE AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5972 Observation id SEQ NUM 290464 Sequence number RA NOM 88.840536028237 Nominal RA DEC NOM 7.2423740476812 Nominal Dec ROLL NOM 286.0340138362 Nominal Roll

Summary Page Created:Tue February 21, 2006 17:13 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290464

Instrument: HRC Obs ID: 5972 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 88.711604 7.524050 158.674103 24.904148 6.371393 88.781862 7.544141 139.746429 28.725000 4.864975 88.810228 7.534882 125.458336 27.225447 4.608128 88.806374 7.544690 119.414284 27.921263 4.276823 88.894661 7.008408 93.098038 22.250023 4.184177 88.736939 7.531632 120.133926 28.858492 4.162862 88.859354 6.998131 65.666664 18.415903 3.565758 88.839061 7.451374 49.633038 14.197176 3.495980 88.723458 7.472557 75.165520 21.681269 3.466841 88.721276 7.481683 74.636734 22.863766 3.264411