Summary Page Created:Sat November 24, 2007 10:48 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290467

Instrument: HRC Obs ID: 5975 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05975N003 full img2.fits hrcf05975N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 10:48 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290467

Instrument: HRC Obs ID: 5975 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T15:37:26 Date and time of file creation DATE-OBS 2005-06-23T14:58:23 Observation start date DATE-END 2005-06-23T15:48:11 Observation end date RA PNT 279.23039113782 Pointing RA DEC PNT 38.786121658122 Pointing Dec ROLL PNT 172.75453942828 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T15:47:19 Date and time of file creation DATE-OBS 2005-06-23T14:58:23 Observation start date DATE-END 2005-06-23T15:48:11 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5975 Observation id SEQ NUM 290467 Sequence number RA NOM 279.23039113782 Nominal RA DEC NOM 38.786121658122 Nominal Dec ROLL NOM 172.75453942828 Nominal Roll

Summary Page Created:Sat November 24, 2007 10:48 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290467

Instrument: HRC Obs ID: 5975 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.419853 38.866659 26.034483 7.443558 3.497586 279.338986 39.087087 62.435215 18.349037 3.402643 278.842271 38.856588 52.463394 16.373819 3.204102 278.971734 38.687774 33.694813 10.892429 3.093416 278.973716 38.738437 27.442858 9.082856 3.021391 279.609911 38.811632 48.408035 16.108921 3.005045