Summary Page Created:Sat March 11, 2006 12:25 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290468

Instrument: HRC Obs ID: 5976 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05976N002 full img2.fits hrcf05976N002 cntr img2.fits

Summary Page Created:Sat March 11, 2006 12:25 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290468

Instrument: HRC Obs ID: 5976 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-11T16:51:21 Date and time of file creation DATE-OBS 2005-06-23T15:48:11 Observation start date DATE-END 2005-06-23T16:30:00 Observation end date RA PNT 279.22908949299 Pointing RA DEC PNT 38.784308620422 Pointing Dec ROLL PNT 172.96185004099 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-11T17:23:56 Date and time of file creation DATE-OBS 2005-06-23T15:48:11 Observation start date DATE-END 2005-06-23T16:30:00 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5976 Observation id SEQ NUM 290468 Sequence number RA NOM 279.22908949299 Nominal RA DEC NOM 38.784308620422 Nominal Dec ROLL NOM 172.96185004099 Nominal Roll

Summary Page Created:Sat March 11, 2006 12:25 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290468

Instrument: HRC Obs ID: 5976 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235183 38.784174 171.750000 18.345276 9.362083 279.623537 38.789380 219.449112 27.218857 8.062392 279.615791 38.739267 165.663391 29.089569 5.694942 279.614784 38.719341 136.054459 27.763115 4.900548 279.597206 38.794259 133.166672 27.659475 4.814504 279.607022 38.695132 121.113396 26.197186 4.623145 279.592223 38.695570 124.082146 27.572645 4.500190 279.582406 38.696960 119.833336 26.740858 4.481282 279.454364 38.711280 64.458336 15.413790 4.181861 279.617066 38.764770 123.708038 31.992622 3.866768