Summary Page Created:Sat November 24, 2007 11:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290471

Instrument: HRC Obs ID: 5979 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05979N003 full img2.fits hrcf05979N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 11:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290471

Instrument: HRC Obs ID: 5979 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:21:22 Date and time of file creation DATE-OBS 2005-09-27T08:06:24 Observation start date DATE-END 2005-09-27T09:25:56 Observation end date RA PNT 332.16464175398 Pointing RA DEC PNT 45.74102050717 Pointing Dec ROLL PNT 221.61577259495 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:33:43 Date and time of file creation DATE-OBS 2005-09-27T08:06:24 Observation start date DATE-END 2005-09-27T09:25:56 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5979 Observation id SEQ NUM 290471 Sequence number RA NOM 332.16464175398 Nominal RA DEC NOM 45.74102050717 Nominal Dec ROLL NOM 221.61577259495 Nominal Roll

Summary Page Created:Sat November 24, 2007 11:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290471

Instrument: HRC Obs ID: 5979 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169955 45.742364 12692.000000 120.919266 104.962593 332.382326 45.489896 101.208336 22.633051 4.471705 332.457774 45.979074 134.242523 30.788523 4.360148 332.358538 45.985939 99.291664 23.668196 4.195152 332.510467 45.546884 89.816071 22.003056 4.081982 332.347946 45.490081 89.958336 22.670794 3.968027 332.058986 46.002670 67.885315 18.500294 3.669418 332.412101 45.490180 96.611610 26.400515 3.659459 332.504475 45.536714 100.980064 27.696375 3.645967 332.435105 45.488907 100.215950 28.105001 3.565769